One could maintain up to 40 search
conditions in a single session.
Visitor can play with the exact number,
prior to his own needs!

Buttons:
* Add - insert the criteria positioned to to the
search condition area;

* Delete List - removes all conditions stored
from the history i.e. start with new clean 
history list.

Fields:
* Only one numeric field. Type a number between
0 and 40 and hit <Enter> to tell iLibrary the size
of history list You wish.
